-- NetUP connection via agent
ALTER TABLE netup_settings
  ADD COLUMN IF NOT EXISTS connection_type VARCHAR(10) NOT NULL DEFAULT 'direct',
  ADD COLUMN IF NOT EXISTS agent_workstation_id UUID REFERENCES workstations(id) ON DELETE SET NULL;
